%auto-ignore
\begin{table}[h!]
\centering
\resizebox{0.98\linewidth}{!}{
    \renewcommand{\arraystretch}{1.1}
    \begin{tabular}{p{0.27\linewidth}|c|ccc}
    \hline
    Model & IoU (\%) & F1 (\%) & Precision (\%) & Recall (\%)\\ \hline\hline
    Local logit only & 71.3 & 83.2 & 84.5 & \textbf{81.9} \\ \hline
    Global logit + binary location map (ours) & \textbf{71.9} & \textbf{83.6} & \textbf{86.2} & 81.3\\ \hline
    
\end{tabular}
}
\vspace{-1mm}
\caption{Comparison between using only local logit map and global logit map as fine module input. By including the logit map of the entire image, our model avoids over-prediction. }
\label{table:logit}
\vspace{-2mm}
\end{table}